0.1 1 0.1

1

10

100 CDF data E_T^{Jet1,2} Γ 7 GeV 0.035 Λ ξ Λ 0.095 | t | Λ 1.0 GeV^2

H1 fit-2 H1 fit-3 ( Q^2= 75 GeV^2 )

β

F^{ψD}_{JJ} (β)